-- Add migration script here
CREATE TABLE Telemetry (
    timestamp TIMESTAMP NOT NULL,
    Software_Version VARCHAR(255),
    Voltage FLOAT,
    Temperature FLOAT,
    uptime FLOAT,
    device_id CHAR(32),
    FOREIGN KEY (device_id) REFERENCES Devices(ID)
);